	 SAVE THIS SIZE - The current size can be saved either to$
	 as an XTS file and/or to the symbol table. If you choose$
	 the XTS file, you will be presented with a list of ccs  $
	 files in the current directory. Select a file, or enter $
	 a new file name. Unless you save to the symbol table,   $
	 you will be reminded that the new size was NOT save when$
	 you return to grid mode.                                $
								 $
	 RESET TO ORIGINAL SIZE - This option will restore the   $
	 image to it's original size.                            $
								 $
	 SIZE MENU - This option will present the size menu. You $
	 can change the current size. The current size is the    $
	 size of the image being shown.                          $
